Quadritek Subnet Calculator Help

The subnet calculator provides the network administrator with the ability to calculate the total number of subnets, the total number of hosts, and the boundaries of each subnet given the network address and the subnet mask.

The calculator is simple to use and valuable in its application. Type your network address. Your network class is automatically inserted into the "Class Type" field. Use the slider ( or type-in your subnet mask ) to obtain the desired number of subnets and the number of hosts in that subnet (Figure 1). Click on the "List" button to see the "Network List" window. The subnet boundaries and list of hosts' IP Addresses will be displayed (Figure 2). Click on the "Report" button to generate a report of the subnets and hosts.  This report will be formatted and loaded into the Microsoft Windows Write/Wordpad editor.  The report can then be printed or saved to a file.

That's it! Quadritek has made the Subnet Calculator a simple tool to use while making subnet masking an easier task to accomplish. All of Quadritek's  products are designed to assist network professionals in managing their network by bringing networking solutions closer to the desktop. For more information on Quadritek visit our world wide web site at www.quadritek.com or call us at 1.800.40.TCPIP.

The Quadritek Subnet Calculator is a product of Quadritek Systems, Inc. and is governed by all applicable copyright laws.        © 1996 Quadritek Systems, Inc.

 Figure 1  Network 180.32.0.0, subnet mask 255.255.254.0

Figure 2 Network List Box showing subnet list and host list

of subnet 180.32.6.0